Figur e 1: Sensitivity to Limiting the Number of Open Connections. This data shows the Free Software Site and the percentage of requests handled by persistent connections as we limit the maximum number of open connections. The connection limit can force connections to close prematurely reducing the benefit of the persistent connections.

0 25 50 75

0 30 60 90 120 150 180

% Requests handled by open connections

Time-out (in seconds)

Maximum of 10 server connections Maximum of 64 server connections Maximum of 128 server connections No limit on server connections